N

Existing Hospital

Nursing Home

700 Stearns Place

STEARNSAVENUE

WASHBURNEAVENUE

FIRST STREET WEST

The colored areas are the additions to be done in the $4.9 million building project. The project also involves extensive remodeling in the hospital, a new roof, and a sprinkler system in the nursing home.